---
title: MariaDB
sidebar_label: MariaDB
description: "MariaDB is a community-developed fork of MySQL."
hide_title: true
---

{/*
Licensed to the Apache Software Foundation (ASF) under one
or more contributor license agreements.  See the NOTICE file
distributed with this work for additional information
regarding copyright ownership.  The ASF licenses this file
to you under the Apache License, Version 2.0 (the
"License"); you may not use this file except in compliance
with the License.  You may obtain a copy of the License at

  http://www.apache.org/licenses/LICENSE-2.0

Unless required by applicable law or agreed to in writing,
software distributed under the License is distributed on an
"AS IS" BASIS, WITHOUT WARRANTIES OR CONDITIONS OF ANY
KIND, either express or implied.  See the License for the
specific language governing permissions and limitations
under the License.
*/}

import { DatabasePage } from '@site/src/components/databases';

export const databaseInfo = {"engine":"mariadb","engine_name":"MariaDB","module":"mariadb","documentation":{"description":"MariaDB is a community-developed fork of MySQL.","logo":"mariadb.png","homepage_url":"https://mariadb.org/","pypi_packages":["mysqlclient","mysqlclient"],"connection_string":"mysql://{username}:{password}@{host}/{database}","default_port":3306,"parameters":{"username":"Database username","password":"Database password","host":"localhost, 127.0.0.1, IP address, or hostname","database":"Database name"},"host_examples":[{"platform":"Localhost","host":"localhost or 127.0.0.1"},{"platform":"Docker on Linux","host":"172.18.0.1"},{"platform":"Docker on macOS","host":"docker.for.mac.host.internal"},{"platform":"On-premise","host":"IP address or hostname"}],"drivers":[{"name":"mysqlclient","pypi_package":"mysqlclient","connection_string":"mysql://{username}:{password}@{host}/{database}","is_recommended":true,"notes":"Recommended driver. May fail with caching_sha2_password auth."},{"name":"mysql-connector-python","pypi_package":"mysql-connector-python","connection_string":"mysql+mysqlconnector://{username}:{password}@{host}/{database}","is_recommended":false,"notes":"Required for newer MySQL databases using caching_sha2_password authentication."}],"categories":["TRADITIONAL_RDBMS","OPEN_SOURCE"],"notes":"Uses the MySQL driver. Fully compatible with MySQL connector."},"time_grains":{"SECOND":true,"FIVE_SECONDS":false,"THIRTY_SECONDS":false,"MINUTE":true,"FIVE_MINUTES":false,"TEN_MINUTES":false,"FIFTEEN_MINUTES":false,"THIRTY_MINUTES":false,"HALF_HOUR":false,"HOUR":true,"SIX_HOURS":false,"DAY":true,"WEEK":true,"WEEK_STARTING_SUNDAY":false,"WEEK_STARTING_MONDAY":true,"WEEK_ENDING_SATURDAY":false,"WEEK_ENDING_SUNDAY":false,"MONTH":true,"QUARTER":true,"QUARTER_YEAR":false,"YEAR":true},"score":59,"max_score":201,"joins":true,"subqueries":true,"supports_dynamic_schema":true,"supports_catalog":false,"supports_dynamic_catalog":false,"ssh_tunneling":true,"supports_file_upload":true,"query_cancelation":true,"query_cost_estimation":false,"sql_validation":false,"user_impersonation":false};

<DatabasePage name="MariaDB" database={databaseInfo} />
