---
title: Microsoft SQL Server
hide_title: true
sidebar_position: 30
version: 1
---

## SQL Server

The recommended connector library for SQL Server is [pymssql](https://github.com/pymssql/pymssql).

The connection string for SQL Server looks like this:

```
mssql+pymssql://<Username>:<Password>@<Host>:<Port-default:1433>/<Database Name>/?Encrypt=yes
```
