---
title: Dremio
hide_title: true
sidebar_position: 17
version: 1
---

## Dremio

The recommended connector library for Dremio is
[sqlalchemy_dremio](https://pypi.org/project/sqlalchemy-dremio/).

The expected connection string for ODBC (Default port is 31010) is formatted as follows:

```
dremio://{username}:{password}@{host}:{port}/{database_name}/dremio?SSL=1
```

The expected connection string for Arrow Flight (Dremio 4.9.1+. Default port is 32010) is formatted as follows:

```
dremio+flight://{username}:{password}@{host}:{port}/dremio
```

This [blog post by Dremio](https://www.dremio.com/tutorials/dremio-apache-superset/) has some
additional helpful instructions on connecting Superset to Dremio.
