---
title: Firebolt
hide_title: true
sidebar_position: 39
version: 1
---

## Firebolt

The recommended connector library for Firebolt is [firebolt-sqlalchemy](https://pypi.org/project/firebolt-sqlalchemy/).
Superset has been tested on `firebolt-sqlalchemy>=0.0.1`.

The recommended connection string is:

```
firebolt://{username}:{password}@{database}
or
firebolt://{username}:{password}@{database}/{engine_name}
```

Here's a connection string example of Superset connecting to a Firebolt database:

```
firebolt://email@domain:password@sample_database
or
firebolt://email@domain:password@sample_database/sample_engine
```
