---
id: warm-up-the-cache-for-each-chart-powered-by-the-given-table
title: "Warm up the cache for each chart powered by the given table"
description: "Warms up the cache for the table. Note for slices a force refresh occurs. In terms of the `extra_filters` these can be obtained from records in the JSON encoded `logs.json` column associated with the `explore_json` action."
sidebar_label: "Warm up the cache for each chart powered by the given table"
hide_title: true
hide_table_of_contents: true
api: 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
sidebar_class_name: "put api-method"
info_path: developer-docs/api/superset
custom_edit_url: null
hide_send_button: true
show_extensions: true
---

import MethodEndpoint from "@theme/ApiExplorer/MethodEndpoint";
import ParamsDetails from "@theme/ParamsDetails";
import RequestSchema from "@theme/RequestSchema";
import StatusCodes from "@theme/StatusCodes";
import OperationTabs from "@theme/OperationTabs";
import TabItem from "@theme/TabItem";
import Heading from "@theme/Heading";
import Translate from "@docusaurus/Translate";

<Heading
  as={"h1"}
  className={"openapi__heading"}
  children={"Warm up the cache for each chart powered by the given table"}
>
</Heading>

<MethodEndpoint
  method={"put"}
  path={"/api/v1/dataset/warm_up_cache"}
  context={"endpoint"}
>

</MethodEndpoint>



Warms up the cache for the table. Note for slices a force refresh occurs. In terms of the `extra_filters` these can be obtained from records in the JSON encoded `logs.json` column associated with the `explore_json` action.

<Heading
  id={"request"}
  as={"h2"}
  className={"openapi-tabs__heading"}
>
  <Translate id="theme.openapi.request.title">Request</Translate>
</Heading>

<ParamsDetails>

</ParamsDetails>

<RequestSchema
  {...require("./warm-up-the-cache-for-each-chart-powered-by-the-given-table.RequestSchema.json")}
>

</RequestSchema>

<StatusCodes
  {...require("./warm-up-the-cache-for-each-chart-powered-by-the-given-table.StatusCodes.json")}
>

</StatusCodes>
